Caching DLL Messages

The following messages may be issued by the Caching DLL.

Bad parameter passed to Caching DLL

Can't load Caching DLL resource

Error reading Caching DLL profile item

Internal inconsistency detected in Caching DLL

Invalid Caching DLL cache context handle

Invalid Caching DLL caller instance handle

Out of global memory in Caching DLL

Out of local memory in Caching DLL


Bad parameter passed to Caching DLL

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Can't load Caching DLL resource

Free memory may be exhausted, or memory contents are corrupted.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Error reading Caching DLL profile item

Information stored in the application's .INI file could not be located.  If the .INI file is corrupted, you will need to restore a backup copy or, possibly, reinstall the stoftware.  You should probably check with Technical Support before proceeding.


Internal inconsistency detected in Caching DLL

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Invalid Caching DLL cache context handle

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Invalid Caching DLL caller instance handle

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Out of global memory in Caching DLL

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.


Out of local memory in Caching DLL

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.