Caching DLL Loader Messages

The Caching DLL Loader locates and loads the programming needed to cache data.  These messages may be issued by the loader routines.

Can't establish Caching DLL caller instance

Can't load Caching DLL

Can't load string resource

Can't locate Caching DLL

GetProcAddress failure for GSC_INFO

Incompatible Caching DLL

Out of global memory

Out of local memory


Can't establish Caching DLL caller instance

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Can't load Caching DLL

The Caching DLL can't be loaded into memory.  Make sure the file is not corrupted and you have the proper access permissions.


Can't load string resource

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.


Can't locate Caching DLL

The Caching DLL can't be located.  Make sure the file is installed and you have the proper access permissions.


GetProcAddress failure for GSC_INFO

The program has detected an internal error.  Save your work and restart the program.  Please report this situation to Technical Support.


Incompatible Caching DLL

The program has detected a version of the Caching DLL which is not compatible with the rest of the application.  Close all active applications and restart Windows.  If this problem persists, contact Technical Support.


Out of global memory

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.


Out of local memory

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.