Type Manager Messages

The following messages may be issued by the Type Manager module.

Can't load Type Manager resource

Can't locate font engine

Could not establish a font engine instance

Error closing font engine instance

Error reading Type Manager profile information

Font context not properly closed

Font engine not compatible with Type Manager

GetProcAddress failure for GFE_INFO

Internal inconsistency in Type Manager

Invalid Type Manager caller instance handle

Invalid Type Manager Font Context handle

Out of global memory

Out of local memory

Problem loading font engine


Can't load Type Manager resource

Free memory may be exhausted, or memory contents are corrupted.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Can't locate font engine

The Font Engine DLL necessary to handle a specific typeface technology can't be located.  Make sure the file is installed and you have the proper access permissions.


Could not establish a font engine instance

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Error closing font engine instance

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Error reading Type Manager profile information

Information stored in the application's .INI file could not be located.  If the .INI file is corrupted, you will need to restore a backup copy or, possibly, reinstall the stoftware.  You should probably check with Technical Support before proceeding.


Font context not properly closed

The program has detected a non-fatal internal inconsistency.  It is recommended you save your work and restart the application.  If you continue to get this message, contact Technical Support.


Font engine not compatible with Type Manager

The program has detected a version of a Font Engine DLL which is not compatible with the rest of the application.  Close all active applications and restart Windows.  If this problem persists, contact Technical Support.


GetProcAddress failure for GFE_INFO

The program has detected an internal error.  Save your work and restart the program.  Please report this situation to Technical Support.


Internal inconsistency in Type Manager

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Invalid Type Manager caller instance handle

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Invalid Type Manager Font Context handle

The program has detected an internal error.  Close all active applications and restart Windows.  Please report this situation to Technical Support.


Out of global memory

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.


Out of local memory

Free memory may be exhausted.  Close all active applications and restart Windows.  If you get this message often, contact Technical Support.


Problem loading font engine

The Font Engine DLL necessary to handle a specific typeface technology can't be loaded into memory.  Make sure the file is not corrupted and you have the proper access permissions.